\chapter{InfiniBand node configuration\label{a:infiniband_config}}

\begin{figure}[ht!]
      \vspace{-0.0cm}
      \lstinputlisting[caption=The configuration that was used to examine the InfiniBand node-type with the benchmark from \autoref{fig:villas_benchmark}. The bash variables were replaced by a script that controlled the benchmark.,
                       label=lst:infiniband_config,
                       style=customconfig]{listings/infiniband.conf}
      \vspace{-1.4cm}
\end{figure}
