\chapter{Tuned daemon profile\label{a:tuned_profile}}
This appendix shows the \textit{latency-performance} \texttt{tuned} profile that was used during the benchmarks that were run on the \glspl{hca} and VILLASnode.
\begin{figure}[ht!]
    \vspace{0.5cm}
    \lstinputlisting[caption=The \texttt{tuned} default profile \textit{latency-performance}. Comments are omitted for the sake of brevity.,
            		 label=lst:tuned_latency_performance,
                     style=customconfig]{listings/tuned_latency_performance.conf}
    \vspace{-0.2cm}
\end{figure}

